<script>
	const config = require('./static/config.js');
	export default {
		onLaunch: function() {
			let href = location.href;
			let code  = this.getQueryString('code');
			if(!code){
				let url =  href.split('#')[0];
				url = encodeURIComponent(url);
				url = "https://open.weixin.qq.com/connect/oauth2/authorize?appid="+config.appid+"&redirect_uri="+url+"&response_type=code&scope=snsapi_userinfo&state=123&connect_redirect=1#wechat_redirect"
				window.location.href = url;
			}
			let BASE_URL = "";
			var env ='';
			let res = "3"
			switch(res){
			   case '1': //dev
			     BASE_URL = 'http://192.168.4.212:8866' // 开发环境
				 env = 'dev'
				  break;
			   case '2': //test
			      BASE_URL = 'https://opentest1.elab.ink'
				  env = 'test'
				  break;
			   case '3'://test2
				  BASE_URL = 'https://opentest2.elab.ink'
				  env = 'test2'
				  break;
			   case '4'://test3
				  BASE_URL = 'https://gatewaytest3.skyforestcity.com'
				  env = 'test3'
				  break;
			   case '5'://test4
				  BASE_URL = 'https://gatewaytest4.skyforestcity.com'
				  env = 'test4'
				  break;
			   case '6'://uat3
			      BASE_URL = "https://api-uat3.elaber.cn"
				  env = 'uat3'
				  break;
			   case '7': //uat
			       BASE_URL = "https://api-uat.elaber.cn"
				   env = 'uat'
				  break;
			   case '8':  // 线上 product 
			   default:
			       BASE_URL = "https://dm-api.elab-plus.cn"
				   env = 'production'
				   break;
			}
			this.globalData.BASE_URL = BASE_URL;
			this.globalData.env = env;
		},
		onShow: function() {
			let token = this.$cache.get('_token_owner_union');
			let userId =  this.$cache.get('_user_id');
			let shareToken  = this.getQueryString('shareToken');
			let projectId  = this.getQueryString('projectId');
			this.globalData.projectId = projectId;
			this.globalData.shareToken = shareToken;
			if (!token||!userId) {
				this.globalData.userId = userId;
				this.regist();
			} else {
				this.globalData.token = token;
				this.globalData.userId = userId;
			}
			document.body.style.setProperty("background-color",this.globalData.color4)
		},
		onHide: function() {

		},
		methods: {
			getThemeInfo() {
			
			},
			getQueryString(name){
				var reg = new RegExp("(^|\\?|&)"+ name +"=([^&]*)(\\s|&|$)", "i");
				return reg.test(location.href) ? unescape(RegExp.$2.replace(/\+/g, " ")) : ""
			},
			async regist() {
				let code  = this.getQueryString('code');
				let ret = await this.$myRequest({
					url: "/regist",
					data: {
						"code": code,
						"shareToken":this.globalData.shareToken||"",
						"projectId":this.globalData.projectId||"",
					}
				});
				if (ret.data.success) {
					let userId = ret.data.single.userId;
					this.$cache.set("_user_id",userId,0);
					this.globalData.userId = userId;
					if (ret.data.single.authed == 1) {
						let token = ret.data.single.token;
						this.$cache.set('_token_owner_union', token);
						this.globalData.token = token
					}
				}
			},
		},
		globalData: {
			token: "",
			userId:"",
			projectId:"",
			shareToken:"",
			color1: "#F07423",
			color2: "#FD8F3C",
			color3: "#FFC444",
			color4: "#F5F5F7",
			color5: "#F7A98E",
			color6: "#FFF4EB",
			color7:"#F8BA91",
			color8:"#FFF4EB",
			color9:"#8B654D",
			color10:"#FCF6F1",
			BASE_URL:"https://dm-api.elab-plus.cn",//默认环境
		}
	}
</script>

<style>
	
</style>
